-- phpMyAdmin SQL Dump
-- version 3.5.8.2
-- http://www.phpmyadmin.net
--
-- Host: 127.0.0.1
-- Erstellungszeit: 21. Okt 2013 um 16:39
-- Server Version: 5.1.66-0+squeeze1
-- PHP-Version: 5.3.24

SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8 */;

--
-- Datenbank: `xb5525_db4`
--

-- --------------------------------------------------------

--
-- Tabellenstruktur für Tabelle `sys_file_processedfile`
--

CREATE TABLE IF NOT EXISTS `sys_file_processedfile` (
  `uid` int(11) NOT NULL AUTO_INCREMENT,
  `tstamp` int(11) NOT NULL DEFAULT '0',
  `crdate` int(11) NOT NULL DEFAULT '0',
  `storage` int(11) NOT NULL DEFAULT '0',
  `original` int(11) NOT NULL DEFAULT '0',
  `identifier` varchar(512) DEFAULT '',
  `name` tinytext CHARACTER SET latin1,
  `configuration` text CHARACTER SET latin1,
  `originalfilesha1` varchar(40) CHARACTER SET latin1 NOT NULL DEFAULT '',
  `task_type` varchar(200) CHARACTER SET latin1 NOT NULL DEFAULT '',
  `checksum` varchar(255) CHARACTER SET latin1 NOT NULL DEFAULT '',
  `width` int(11) DEFAULT '0',
  `height` int(11) DEFAULT '0',
  PRIMARY KEY (`uid`)
) ENGINE=MyISAM  DEFAULT CHARSET=utf8 AUTO_INCREMENT=14 ;

--
-- Daten für Tabelle `sys_file_processedfile`
--

INSERT INTO `sys_file_processedfile` (`uid`, `tstamp`, `crdate`, `storage`, `original`, `identifier`, `name`, `configuration`, `originalfilesha1`, `task_type`, `checksum`, `width`, `height`) VALUES
(1, 1382366012, 1382366012, 1, 750, '', NULL, 'a:10:{s:5:"width";N;s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:720;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', '13a01f683a8753540325f50f61be6bd34cc806c9', 'Image.CropScaleMask', '38977af44b', 0, 0),
(2, 1382366012, 1382366012, 1, 544, '', NULL, 'a:10:{s:5:"width";N;s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:0;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', '53c88e6d36f3a59130a25d7bbebc12569753a219', 'Image.CropScaleMask', 'd77b48d627', 0, 0),
(3, 1382366012, 1382366012, 1, 507, '', NULL, 'a:10:{s:5:"width";N;s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:0;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', 'ce555b70b0be20e47aac7e563500380e694b690f', 'Image.CropScaleMask', 'b5fa5a9189', 0, 0),
(4, 1382366012, 1382366012, 1, 546, '', NULL, 'a:10:{s:5:"width";N;s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:0;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', '0f16961522af635ee52f86dd53861393656966d3', 'Image.CropScaleMask', '89b5087f9f', 0, 0),
(5, 1382366012, 1382366012, 1, 549, '', NULL, 'a:10:{s:5:"width";N;s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:0;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', '65150954d6f7d162105dc530fae8298d19c6c10c', 'Image.CropScaleMask', 'e647f514dc', 0, 0),
(6, 1382366012, 1382366012, 1, 526, '', NULL, 'a:10:{s:5:"width";N;s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:0;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', 'bcbc9ed0b13aca2771d1a515180957408c8ab914', 'Image.CropScaleMask', 'bf5d60f95d', 0, 0),
(7, 1382366012, 1382366012, 1, 528, '', NULL, 'a:10:{s:5:"width";N;s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:0;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', 'e502dc612b62981a570600c89cdc00f0b43f69af', 'Image.CropScaleMask', 'a8969661c5', 0, 0),
(8, 1382366012, 1382366012, 1, 530, '', NULL, 'a:10:{s:5:"width";N;s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:0;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', 'e078e422d162cdef7cc75f0a96154dedbbc0ba0f', 'Image.CropScaleMask', '9338583d75', 0, 0),
(9, 1382366012, 1382366012, 1, 540, '', NULL, 'a:10:{s:5:"width";N;s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:0;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', '2f1f23b0a5aec9bf2db759b278ec7bd2d427b7e9', 'Image.CropScaleMask', 'b46ef6316a', 0, 0),
(10, 1382366013, 1382366013, 1, 38, '/_processed_/csm_bezirke_rv-nordwest.jpg_09_7918d66a84.gif', 'csm_bezirke_rv-nordwest.jpg_09_7918d66a84.gif', 'a:10:{s:5:"width";s:3:"190";s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:300;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', '8506c6822fa045021040bb452185b9a3e6ff21bd', 'Image.CropScaleMask', '7918d66a84', 190, 151),
(11, 1382366014, 1382366014, 1, 36, '', NULL, 'a:10:{s:5:"width";s:1:"0";s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:600;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', '25a4469deb14306141458e4098df6646ff46cb13', 'Image.CropScaleMask', 'f5a7f7e6f0', 0, 0),
(12, 1382366014, 1382366014, 1, 38, '', NULL, 'a:10:{s:5:"width";N;s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:0;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', '8506c6822fa045021040bb452185b9a3e6ff21bd', 'Image.CropScaleMask', 'a75214798e', 0, 0),
(13, 1382366014, 1382366014, 1, 36, '', NULL, 'a:10:{s:5:"width";N;s:6:"height";N;s:13:"fileExtension";N;s:8:"maxWidth";i:0;s:9:"maxHeight";i:0;s:8:"minWidth";i:0;s:9:"minHeight";i:0;s:7:"noScale";N;s:20:"additionalParameters";N;s:25:"useTargetFileNameAsPrefix";i:1;}', '25a4469deb14306141458e4098df6646ff46cb13', 'Image.CropScaleMask', '3bd1f5e714', 0, 0);

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
